\begin{titlepage}
    \begin{center}
        {\normalsize\textbf{Early detection of patient deterioration at home using smart medical sensors}} \\
        \vspace{1cm}
        \includegraphics[width=0.5\textwidth]{figures/tubs-logo.png} \\
        \vspace{1cm}
        {\large{Bachelor Thesis}} \\
        \vspace{1cm}
        {\small\textbf{
            submitted to \\
            Peter L. Reichertz Institut für Medizinische Informatik \\
            der Technischen Universität Braunschweig \\
            und der Medizinischen Hochschule Hannover \\
            \vspace{0.5cm}
            in September 2023 \\
            \vspace{0.5cm}
            by \\
            Julian Lobbes \\
            from Hannover
        }} \\
    \end{center}
    \vfill
    {\footnotesize{
        Supervisor: Prof. Dr. Thomas M. Deserno \\
        Supervising assistant: Prof. Dr. Sharareh R. Niakan Kalhori \\
    }}
\end{titlepage}
%\newpage
